\chapter*{Introduction}
This report describes my internship at Recore Systems. Having heard of Recore
and their innovative Montium chip during a few courses, I got involved with the
Montium and its tooling during some DSP work during another course at the
University of Twente.

From that initial contact, arrangements for an internship were quickly made, and
so I have started my intership in May. In this report I will describe the most
interesting points of the work I have done until the end of my intership in
August.

The first chapter provides some context, such as a description of Recore
Systems, their products and the tools I have been using. 

The second chapter provides an overview of the assignment and the challenges
faced when completing it.

The third chapter lists a number of tasks that are still unfinished and future
work.

The last chapter provides a number of conclusions about my internship and the
work performed.
