\section{Recore Systems}
Recore Systems is a relatively young IT company based in Enschede, the
Netherlands. It emerged as the result of research at the University of Twente
and focuses on developing hardware IP blocks for use in semiconductor devices.
The main product of Recore is to be the Montium Tile Processor, a low energy,
high performance reconfigurable processor aimed at low-power DSP applications.
The Montium will be discussed in more detail in the next section.

Recore aims to provide a full solution for semiconductor manufactures and their
customers, by providing IP blocks such as the Montium, tools for working with
them such as a compiler, an IDE and simulation environments and sample programs
and DSP libraries to ease application development. Currently, all of these
components are still in a development stage, but already used internally and by
the University of Twente.
